Best Value Wood Barns

Best Value Wood Barns

Our best value wood barn is a sturdy portable building with 24″ on center studs, and doubled every 4 ft. Furthermore, it has a high quality galvalume metal roof with 2 x 4 floor joists that are set into notched skids. They’re available in lofted or side lofted styles, and you even have several colors from which to choose.
Also available as options are 2′ x 3′ & 3′ x 3′ windows.
Ask your dealer for details.

Our Lofted Barns increase the square footage even more because the upper attic can be used for anything from a bed to just more space for all those seasonal decorations. Click Here to see more info on loft sizes.

Sizes Available
8×12
10×12–10×16–10×20
12×16–12×20–12×24

BEST VALUE WOOD
SIDE LOFTED BARN

BEST VALUE WOOD
LOFTED BARN

Sizes Available
8×12
10×12–10×16–10×20
12×16–12×20–12×24

See More Lofted Barns

The post Best Value Wood Barns appeared first on Meridian Our Portable Buildings.